0.3 0.35 0.4 0.45 0.5 0.55 )c (GeV/ p

0.96

0.98

1 purity ±K

10% − 0 30% −10 50% −30

= 2.76 TeV NNs Pb − ALICE Pb

ALI-PUB-544095

ALI-PUB-544095